Standard Performance Evaluation Corporation info@spec.org http://www.spec.org

Copyright ©1999-2007, Standard Performance Evaluation Corporation

Fujitsu Limited Fujitsu SPARC Enterprise M8000

SPECompMpeak2001 = SPECompMbase2001 =

66283 59179

SPEC license #:HPG0003 Tested by: Fujitsu Limited Test site: Test date: Apr-2007 Hardware Avail:Apr-2007 Software Avail: Jul-2007

Benchmark

Reference

Time

Base Runtime

Base Ratio

Peak Runtime

Peak Ratio 100000 200000 300000

310.wupwise_m 6000 73.3 81842 56.1 106882

312.swim_m 6000 86.3 69546 86.3 69546

314.mgrid_m 7300 103 70828 95.4 76552

316.applu_m 4000 32.9 121617 32.9 121617

318.galgel_m 5100 240 21271 153 33254

320.equake_m 2600 59.9 43377 51.1 50890

324.apsi_m 3400 41.6 81673 41.6 81673

326.gafort_m 8700 137 63301 137 63301

328.fma3d_m 4600 118 39047 104 44189

330.art_m 6400 27.9 229194 27.8 229814

332.ammp_m 7000 470 14896 397 17646

Hardware

CPU: SPARC64 VI CPU MHz: 2280 FPU: Integrated CPU(s) enabled: 32 cores, 16 chips, 2 cores/chip CPU(s) orderable: 1 to 4 CMUs; each CMU contains 2 or 4 chips Primary Cache: 128 KB I + 128 KB D on chip per core Secondary Cache: 5 MB I+D on chip per chip L3 Cache: None Other Cache: None Memory: 256 GB (128 x 2 GB) Disk Subsystem: 673 GB RAID 1+0 created by Solaris Volume Manager with 20 x 73 GB 10,000 RPM Fujitsu MAY2073RC SAS Other Hardware: --

Software

OpenMP Threads: 32 Parallel: OpenMP and Autoparallel Operating System: Solaris 10 7/07 Compiler: Sun Studio 12 File System: ufs System State: Multi-User

Notes/Tuning Information

Compiler Invocation:
  C:   cc
  F90: f90
  F77: f77

Base Tuning:
  C:       -fast -xopenmp -xalias_level=std -xipo=2 -Xc
           -xprefetch_level=3 -m64 -lmtmalloc
           -xpagesize=4m -xprofile
  Fortran: -fast -openmp -m64 -xipo=2 -autopar
           -fma=fused -xpagesize=4m -xprofile
  ONESTEP=yes

Peak Tuning:
  ONESTEP=yes

  310.wupwise_m: -fast -openmp -autopar -m32 -xipo=2 -fma=fused
                 -xpagesize=512k -xprefetch_level=3
                 -Qoption iropt -Athr,-Apf:l2subblock=256,-Apf:ipa=9
                 -xprofile

Standard Performance Evaluation Corporation info@spec.org http://www.spec.org

Copyright ©1999-2007, Standard Performance Evaluation Corporation

Fujitsu Limited Fujitsu SPARC Enterprise M8000

SPECompMpeak2001 = SPECompMbase2001 =

66283 59179

SPEC license #:HPG0003 Tested by: Fujitsu Limited Test site: Test date: Apr-2007 Hardware Avail:Apr-2007 Software Avail: Jul-2007

Notes/Tuning Information (Continued)

  312.swim_m:    basepeak=yes
  314.mgrid_m:   -fast -openmp -xipo=2 -xprefetch_level=3
                 -Qoption iropt -Apf:l2subblock=256 -m32 -xpagesize=4m
                 -fma=fused -xprefetch=latx:4 -xprofile
  316.applu_m:   basepeak=yes
  318.galgel_m:  -fast -xipo=2 -openmp -autopar -m32 -fma=fused
                 -xlic_lib=sunperf
                 RM_SOURCES=lapak.f90
                 -xalias_level=strong -xprefetch_level=3 -lmtmalloc
  320.equake_m:  -fast -xopenmp -xipo=2 -xrestrict
                 -m32 -xpagesize=64k -W2,-Apf:l2subblock=256
                 -xprofile
  324.apsi_m:    basepeak=yes
  326.gafort_m:  basepeak=yes
  328.fma3d_m:   -fast -openmp -Qoption iropt -Athr,-Apf:pdl=1
                 -Qoption cg -Qlp-ip=1 -xipo=2 -xprefetch_level=3
                 -lmtmalloc -fma=fused -m32 -xprofile
                 Alternative src ompl.32 was used
  330.art_m:     -fast -xopenmp -xalias_level=std -xipo=2
                 -xprefetch_level=3 -W2,-Apf:outer=0:pdl=1
                 -Wc,-Qlp-ip=1 -lmtmalloc -m64 -xprofile
  332.ammp_m:    -fast -xopenmp -xalias_level=strong
                 -xprefetch_level=3 -lmopt -lm -lmtmalloc -m32
                 -xprofile
                 SUNW_MP_GUIDED_SCHED_WEIGHT=2

Portability flags:
  318.galgel_m:  -e -fixed

Extra art allowed flags:
  330.art_m:     -DINTS_PER_CACHELINE=16 -DDBLS_PER_CACHELINE=8

Alternate Source for Peak:
  Approved alternate source ompl.32 was used for 328.fma3d_m

Feedback optimization (-xprofile) is done as follows,
unless otherwise noted:
  fdo_pre0:  rm -rf ‘pwd‘/feedback.profile
  PASS1:     -xprofile=collect:./feedback
  PASS2:     -xprofile=use:./feedback

Base and Peak User Environment:
  unlimit stacksize   (in /bin/csh)
  setenv STACKSIZE 16384
  setenv OMP_NUM_THREADS 32
  setenv OMP_DYNAMIC FALSE
  setenv SUNW_MP_PROCBIND "0 2 4 6 8 10 12 14 16 18
    20 22 24 26 28 30 32 34 36 38 40 42 44 46 48 50
    52 54 56 58 60 62 "
  setenv SUNW_MP_THR_IDLE SPIN

Kernel Paramters (/etc/system):
  set autoup=900
  set tune_t_fsflushr=5

System configuration details located at

Standard Performance Evaluation Corporation info@spec.org http://www.spec.org

Copyright ©1999-2007, Standard Performance Evaluation Corporation

Fujitsu Limited Fujitsu SPARC Enterprise M8000

SPECompMpeak2001 = SPECompMbase2001 =

66283 59179

SPEC license #:HPG0003 Tested by: Fujitsu Limited Test site: Test date: Apr-2007 Hardware Avail:Apr-2007 Software Avail: Jul-2007

Notes/Tuning Information (Continued)

   http://www.fujitsu.com/global/services/computing/server/sparcenterprise/products/

For a description of Sun Studio 12 Compiler flags, portability flags
and system parameters used to generate this result, please refer to
SUN-20070503-Studio-Solaris-sparc.txt file in the flags directory.

This result was measured on a Fujitsu SPARC Enterprise M8000.
The Sun SPARC Enterprise M8000 and the Fujitsu SPARC Enterprise
M8000 are electrically equivalent.