Standard Performance Evaluation Corporation info@spec.org http://www.spec.org spec CINT2000 Result

Copyright ©1999-2005, Standard Performance Evaluation Corporation

ION_{A20 (Intel Xeon processor 5030, 2.67GHz)} SPECint_rate2000 =

SPECint_rate_base2000 =

54.3 54.3

SPEC license #: 2697 Tested by: ION Test date: Aug-2006 Hardware Avail: Jul-2006 Software Avail: Jul-2006

Benchmark

Base Copies

Base Runtime

Base Ratio Copies Runtime Ratio 20 40 60 80 100 164.gzip 4 154 42.1 4 154 42.1

175.vpr 4 173 37.5 4 173 37.5

176.gcc 4 70.4 72.5 4 70.4 72.5

181.mcf 4 225 37.2 4 225 37.2

186.crafty 4 99.5 46.6 4 99.5 46.6

197.parser 4 172 48.6 4 172 48.6

252.eon 4 80.8 74.6 4 80.8 74.6

253.perlbmk 4 114 73.5 4 114 73.5

254.gap 4 87.3 58.5 4 87.3 58.5

255.vortex 4 97.6 90.4 4 97.6 90.4

256.bzip2 4 179 38.9 4 179 38.9

300.twolf 4 229 60.8 4 229 60.8

Hardware

CPU: Intel Xeon Processor 5030 (667Mhz System Bus) CPU MHz: 2667 FPU: Integrated CPU(s) enabled: 4 cores, 2 chips, 2 cores/chip, Hyper-Threading Technology disabled CPU(s) orderable: 1,2 chips Parallel: No Primary Cache: 12k (I) micro-ops + 16KB(D) on chip, per core Secondary Cache: 2MB (I+D) on chip, per core L3 Cache: None Other Cache: None Memory: 8 GB (8*1GB PC2 5300 FB-DIMMs) Disk Subsystem: 1 x 80GB SATA (Seagate ST380817AS Barracuda 7200rpm) Other Hardware: None

Software

Operating System: Red Hat Enterprise Linux ES 4 Update 3 for x86 (32-bit) Compiler: Intel(R) C++ Compiler for 32-bit apps, V9.1 (Build 20060706Z) File System: ext3 System State: Multi-user

Notes/Tuning Information

Tested by ION Computer Systems
 BIOS 2.00 Build 54
   Hyper-Threading Technology Disabled in BIOS
   Enhanced SpeedStep Disabled in BIOS
 kernel 2.6.9-34.0.1.ELsmp
 +FDO: PASS1=-prof_gen  PASS2=-prof_use

 SPEC CINT2000 Baseline optimization flags:
     C programs:     -fast +FDO
   C++ programs:     -fast -ansi_alias +FDO
           +FDO: PASS1=-prof_gen  PASS2=-prof_use

    SPEC CINT2000 Peak optimization flags
      basepeak=yes  set globally

 Portability Flags:
    186.crafty: -DLINUX_i386
       252.eon: -DHAS_ERRLIST
   253.perlbmk: -DSPEC_CPU2000_NEED_BOOL -DSPEC_CPU2000_LINUX_I386
       254.gap: -DSYS_IS_USG