spec SPECweb96 Result

©Copyright 1996, Standards Performance Evaluation Corporation

SPEC95 Announcement, July 1996

SPECweb96= 630

Test Date : Sep-96 Tested by : HP Cupertino, CA

Throughput Response ops/sec msec

Response

Hardware Software HTTP Software

Network

Load Generators

Benchmark Configuration

Notes/Tuning Information