Standard Performance Evaluation Corporation info@spec.org http://www.spec.org spec CFP2000 Result

Copyright ©1999-2004, Standard Performance Evaluation Corporation

Compaq Computer Corporation Evo Workstation W6000

SPECfp2000 = SPECfp_base2000 = 538 530 SPEC license #: 2 Tested by: Compaq Computer Corporation Test date: Aug-2001 Hardware Avail: Jun-2001 Software Avail: Jun-2001

Benchmark

Reference

Time

Base Runtime

Base Ratio Runtime Ratio 500 1000 1500 2000

168.wupwise 1600 214 747 214 747

171.swim 3100 242 1280 243 1278

172.mgrid 1800 341 528 311 578

173.applu 2100 333 630 333 631

177.mesa 1400 267 525 272 514

178.galgel 2900 572 507 571 508

179.art 2600 494 526 482 540

183.equake 1300 181 718 168 776

187.facerec 1900 446 426 441 431

188.ammp 2200 624 353 620 355

189.lucas 2000 270 740 271 739

191.fma3d 2100 520 403 520 404

200.sixtrack 1100 461 239 455 242

301.apsi 2600 640 406 643 405

Hardware

CPU: Intel Xeon processor CPU MHz: 1400 FPU: Integrated CPU(s) enabled: 1 core, 1 chip, 1 core/chip CPU(s) orderable: 1-2 Parallel: No Primary Cache: 12K(I) micro-ops + 8KB(D) on chip Secondary Cache: 256KB(I+D) on chip L3 Cache: N/A Other Cache: N/A Memory: 512MB RIMM 400 MHz Disk Subsystem: Western Digital WD40BB UATA-100 Other Hardware:

Software

Operating System: Windows 2000(Build 2195, service pack 1) Compiler: Intel C/C++ Compiler 5.0 Build 001120

Intel Fortran Compiler 5.0 Build 001027 Microsoft Visual C++ 6.0 (for libraries) Other software: Microquill SmartHeap V5.0

File System: FAT32 System State: Default

Notes/Tuning Information

 +FDO: PASS1=  -Qprof_gen  PASS2=-Qprof_use
 Base tuning:  -Qipo -QxW -O3 +FDO
 Portability:
 178.galgel:   -FI /F32000000
 Peak tuning:
 168.wupwise:  -Qipo -QxW  -O3 +FDO
 171.swim:     -Qipo -QxW  -O3 +FDO
 172.mgrid:    -Qipo -QaxW -O3 +FDO
 173.applu:    -Qipo -QxW  -O3 +FDO
 177.mesa:     -Qipo -QxW  -Oa -O3 +FDO
 178.galgel:   -Qipo -QxW  -O3 +FDO
 179.art:      -Qipo -QxW  -O3 -Oa +FDO shlW32M.lib
 183.equake:   -Qipo -QxW  -Qrcd -Oa +FDO shlW32M.lib
 187.facerec:  -Qipo -QxW  -O3 +FDO shlW32M.lib
 188.ammp:     -Qipo -QxW  -O3 -Oa +FDO
 189.lucas:    -Qipo -QxW  -O3 +FDO
 191.fma3d:    -Qipo -QxW  -O3 +FDO

Standard Performance Evaluation Corporation info@spec.org http://www.spec.org spec CFP2000 Result

Copyright ©1999-2004, Standard Performance Evaluation Corporation

Compaq Computer Corporation Evo Workstation W6000

SPECfp2000 = SPECfp_base2000 = 538 530 SPEC license #: 2 Tested by: Compaq Computer Corporation Test date: Aug-2001 Hardware Avail: Jun-2001 Software Avail: Jun-2001

Notes/Tuning Information (Continued)

 200.sixtrack: -Qipo -QxW  +FDO
 301.apsi:     -Qipo -QxW  -O3 +FDO