Standard Performance Evaluation Corporation info@spec.org http://www.spec.org spec CFP2000 Result

Copyright ©1999-2005, Standard Performance Evaluation Corporation

Fujitsu Siemens Computers

CELSIUS R640, Intel Xeon 5160 processor

SPECfp_rate2000 = SPECfp_rate_base2000 =

82.5 81.4

SPEC license #: 22 Tested by: Fujitsu Siemens Computers Test date: Aug-2006 Hardware Avail: Aug-2006 Software Avail: May-2006

Benchmark

Base Copies

Base Runtime

Base Ratio Copies Runtime Ratio 50 100 150 200 250 168.wupwise 4 67.6 110 4 67.6 110

171.swim 4 269 53.5 4 268 53.6

172.mgrid 4 194 43.1 4 195 42.9

173.applu 4 176 55.2 4 176 55.2

177.mesa 4 50.7 128 4 49.8 130

178.galgel 4 56.6 238 4 56.4 238

179.art 4 52.6 229 4 52.5 230

183.equake 4 91.9 65.6 4 91.9 65.6

187.facerec 4 83.8 105 4 84.1 105

188.ammp 4 145 70.5 4 119 85.9

189.lucas 4 157 59.2 4 157 59.2

191.fma3d 4 163 60.0 4 166 58.7

200.sixtrack 4 94.2 54.2 4 94.2 54.2

301.apsi 4 198 61.1 4 198 61.0

Hardware

CPU: Intel Xeon 5160 processor (3.0 GHz, 1333 MHz system bus) CPU MHz: 3000 FPU: Integrated CPU(s) enabled: 4 cores, 2 chips, 2 cores/chip CPU(s) orderable: 1,2 Parallel: No Primary Cache: 32KBI + 32KBD on chip, per core Secondary Cache: 4096KB(I+D) on chip, per chip L3 Cache: N/A Other Cache: N/A Memory: 8 GB (8x1 GB DDRII 5300F, 2rank, CL5-5-5, with ECC) Disk Subsystem: Serial ATA 7200 rpm Other Hardware:

Software

Operating System: Windows XP, 64 bit Edition Compiler: Intel(R) C++ Compiler for 32-bit app., Version 9.1,

- Build 20060519Z Package ID: W_CC_P_9.1.025 Intel(R) Fortran Compiler for 32-bit app., Version 9.1, - Build 20060519Z Package ID: W_FC_P_9.1.025 Microsoft Visual Studio .NET 2003 (for libraries) MicroQuill SmartHeap Library, Version 8 (shlW32M.lib)

File System: NTFS System State: Default

Notes/Tuning Information

Portability flags:
 178.galgel:  -FI /F32000000

Feedback optimization:
  +FDO: PASS1= -Qprof_gen PASS2= -Qprof_use

Baseline Tuning Flags:
 for C programs:
 -fast +FDO shlW32M.lib
 for Fortran programs:
 -fast +FDO shlW32M.lib

Peak Tuning Flags:
 173.applu:      basepeak=yes
 168.wupwise:  -fast +FDO
 171.swim:     -fast +FDO
 172.mgrid:    -fast +FDO

Standard Performance Evaluation Corporation info@spec.org http://www.spec.org spec CFP2000 Result

Copyright ©1999-2005, Standard Performance Evaluation Corporation

Fujitsu Siemens Computers

CELSIUS R640, Intel Xeon 5160 processor

SPECfp_rate2000 = SPECfp_rate_base2000 =

82.5 81.4

SPEC license #: 22 Tested by: Fujitsu Siemens Computers Test date: Aug-2006 Hardware Avail: Aug-2006 Software Avail: May-2006

Notes/Tuning Information (Continued)

 173.applu:    basepeak=yes
 177.mesa:     -fast +FDO ONESTEP=yes
 178.galgel:   -fast +FDO
 179.art:      -fast +FDO shlW32M.lib
 183.equake:   -fast +FDO shlW32M.lib
 187.facerec:  -fast +FDO
 188.ammp:     -fast +FDO
 189.lucas:    basepeak=yes
 191.fma3d:    -fast +FDO
 200.sixtrack: -fast +FDO
 301.apsi:     -fast +FDO

Extra Libraries:
 shlW32M.lib = Microquill SmartHeap Library 8
 see www.microquill.com

 Compilation was done in
 Windows XP Professional, Service Pack 2

Snoop Filter was enabled in BIOS

For information about Fujitsu Siemens Computers in your country please see:
http://www.fujitsu-siemens.com/countries